\documentclass[a4paper,12pt]{report}
\pagestyle{plain}
\begin{document}
\title{Repairing the HP9866A Thermal Printer}
\author{Dr A. R. Duell\thanks{ard@p850ug1.demon.co.uk}}
\date{March 2011}
\maketitle
\pagenumbering{roman}
\tableofcontents

\chapter{Introduction}
\pagenumbering{arabic}
\input{intro.tex}

\chapter{Overview of the Pritner Operation}

\input{overview.tex}

\chapter{Data Path Theory of Oepration}

\input{data_path.tex}

\chapter{Control System Theory of Operation}

\input{control.tex}

\chapter{The COntrol State Machine}

\input{state_machine.tex}

\chapter{Motor Control Theory of Operation}

\input{motor.tex}

\chapter{Power Supply Theory of Operation}

\input{psu.tex}

\chapter{Dismantling the Printer}

\input{dismantle.tex}

\chapter{Troubleshooting}

\input{troubleshooting.tex}

\end{document}

