\documentclass[a4paper,12pt]{article}
\setlength{\oddsidemargin}{-0.25in}
\setlength{\evensidemargin}{-0.25in}
\setlength{\textwidth}{170mm}
\setlength{\topmargin}{0.25in}
\setlength{\headheight}{0in}
\setlength{\headsep}{0in}
\setlength{\footskip}{0in}
\setlength{\textheight}{240mm}
\pagestyle{empty}
\begin{document}
\begin{center}
{\Large \bf  Repairing HP9800 Desktop Calculators -- Part 6\\
Tony Duell (ard@p850ug1.demon.co.uk)\\}
\end{center}

{ \large 
\noindent
{\Large \bf Tools and Test Equipment\\}

\input{tools.tex}

\setcounter{section}{0}
\noindent
{\Large \bf Dismantling the Machine\\}

\input{dismantle.tex}

}
\end{document}

